American Museum of Natural History Research Library
author: American Museum of Natural History

MacCallie, Ted
Friend of Coltman, traveled from Kalgan to Urga with the Second Asiatic Expedition, a member of Andrews' "Grouchless Gang" MacCallie was bringing to the palace at Urga a 'Delco-light plant' (a small generator and battery system introduced in 1916 to provide electricity and mechanical power to rural areas in America). He also later brought supplies to the expedition in Urga in late 1919
Worked at the American Museum of Natural History in Asiatic Zoological Expedition of the American Museum of Natural History (2nd: 1918-1919).