American Museum of Natural History Research Library
author: American Museum of Natural History

Zahl, Paul A. (Paul Arthur) 1910-1985
birth: 1910
death: 1985
Paul Arthur Zahl was an American biologist. He worked at the American Museum of Natural History as a Research Assistant in the Department of Ichthyology
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Ichthyology.