American Museum of Natural History Research Library
author: American Museum of Natural History

Young, Mahonri Mackintosh, 1877-1957
birth: August 9, 1877
death: 1957
American sculptor and printmaker. The American Museum of Natural History has sculptures made by Young. Art Survey No. 942, Art Survey No. 943, Art Survey No. 944, Art Survey No. 945