American Museum of Natural History Research Library
author: American Museum of Natural History

Woodlock, Ethelyn Hurd 1907-
birth: June 9, 1907
death: 2001
Ethelyn Hurd Woodlock was an artist. The American Museum of Natural History has a watercolor Woodlock did of the museum's south entrance. Art Survey No. 84