American Museum of Natural History Research Library
author: American Museum of Natural History

Wood, Thomas Waterman 1823-1903
birth: 1823
death: 1903
Thomas Waterman Wood was an American painter. He made a number of portraits of important men in New York City, including the portrait of John James Audubon in the American Museum of Natural History. Floor 1, Stack 1-2