American Museum of Natural History Research Library
author: American Museum of Natural History

Wood, Leonard 1860-1927
birth: October 9, 1860
death: August 7, 1927
Leonard Wood was an American soldier and administrator. Good friend of President Theodore Roosevelt, military governor of all of Cuba (1899), governor general of Philippines (1921)