American Museum of Natural History Research Library
author: American Museum of Natural History

Wood, Frank
birth: May 24, 1851
death: January 3, 1933
Frank Wood was a curator of the Old Darthmouth Historical Society (Whaling Museum), of New Bedford. He was also affiliated with the American Museum of Natural History as an associate member