American Museum of Natural History Research Library
author: American Museum of Natural History

Wolff, John Eliot 1857-1940
birth: 1857
death: August 12, 1940
John Eliot Wolf was a geologist. He was an authority on minerals and oil, professor of petrography and mineralogy at Harvard Univeristy