American Museum of Natural History Research Library
author: American Museum of Natural History

Wolfe, John David 1792-1872
birth: July 24, 1792
death: May 17, 1872
John David Wolfe was the first President of the American Museum of Natural History
Worked at the American Museum of Natural History.
Trustee, American Museum of Natural History.