American Museum of Natural History Research Library
author: American Museum of Natural History

Williamson, J. E. (John Ernest) 1881-1966
birth: 1881
death: July 16, 1966
John Ernest Williamson was an undersea photographer. He worked on undersea projects for the Hall of Marine Life at the American Museum of Natural History