American Museum of Natural History Research Library
author: American Museum of Natural History

Williams, Willie
Willie Williams was a gamekeeper of Possum Corner Plantation in South Carolina when he posed as a model for the American Museum of Natural History's diorama Southern Forest Group, South Carolina, Forestry Hall 1952. The diorama is not on display at the museum currently and may not have been executed