American Museum of Natural History Research Library
author: American Museum of Natural History

Williams, Leonard Worcester 1875-1912
birth: 1875
death: 1912
Leonard Worcester Williams was an Assistant in the Department of Invertebrate Zoology at the American Museum of Natural History in the early 1900s
Worked at the American Museum of Natural History.