American Museum of Natural History Research Library
author: American Museum of Natural History

Tedford, Richard H.
birth: April 25, 1929
death: July 15, 2011
Richard Tedford was a Curator in the Department of Vertebrate Paleontology at the American Museum of Natural History. Tedford came to the museum in 1966 and served as Chair of Vertebrate Paleontology between 1976-1982 and 1989-1996. Among many scientific accomplishments was his renown as an expert in carnivore evolution, Australian mammals, and biostratigraphy
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Vertebrate Paleontology.