American Museum of Natural History Research Library
author: American Museum of Natural History

Tate, G. H. H. (George Henry Hamilton) 1894-1953
birth: April 30, 1894
death: December 28, 1953
George H. H. Tate was a Curator in the Department of Mammalogy at the American Museum of Natural History. Tate began working at the museum in 1921 doing field work on an expedition to Ecuador. He was an associate curator of mammals from 1942 to 1946. From 1931 to 1942 he was assistant curator of South American mammals. Tate participated in many AMNH expeditions. He died in 1953
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Mammalogy.