American Museum of Natural History Research Library
author: American Museum of Natural History

Stuart, Robert L.
birth: 1806
death: 1882
Founder
Robert L. Stuart was a charter member and second president of the American Museum of Natural History, from 1873-1881
Trustee, American Museum of Natural History.