American Museum of Natural History Research Library
author: American Museum of Natural History

Squires, Derk
Model maker associated with the American Museum of Natural History. In 1975, Derk Squires, along with Vincent Castello and William Milligan judged ship models made for the Suffolk Marine Museum's 10th annual Long Island Ship Models Exhibition