American Museum of Natural History Research Library
author: American Museum of Natural History

Skinner, Morris F.
birth: 1903
death: December 1990
Paleontologist; worked for the Frick Laboratory (1927-1968) and the American Museum of Natural History (Frick Assistant Curator, 1968-1973)
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Vertebrate Paleontology.