American Museum of Natural History Research Library
author: American Museum of Natural History

Morgan, J. P.
birth: 1867
death: March 13, 1943
John Pierpont Morgan Jr. was elected to the American Museum of Natural History Board of Trustees in March 1908. He was Second Vice President (1911-1931) and First Vice President (from 1934). He made significant financial contributions to the museum before resigning from the Board in 1939
Trustee, American Museum of Natural History.