American Museum of Natural History Research Library
author: American Museum of Natural History

Morgan, J. Pierpont (John Pierpont) 1837-1913
birth: 1837
death: March 31, 1913
John Pierpont Morgan was one of the founders of the American Museum of Natural History. He was a member of the museum's Board of Trustees, serving among many positions, Member and Chairman of the Finance Committee (from 1908), Chairman of Committee on Building and Plans (1908-1910), Second Vice President (from 1911) and Elected Chairman of Executive Committe (from 1911). J. P. Morgan contributed to museum expeditions and public exhibitions
Trustee, American Museum of Natural History.