American Museum of Natural History Research Library
author: American Museum of Natural History

Mayer, Caspar 1871-1931
birth: December 24, 1871
death: August 13, 1931
Sculptor
The American Museum of Natural History has model busts made by Caspar Mayer that were used for study and for exhibition in the Museum and were exchanged with other institutions. Art Survey No. 1454