American Museum of Natural History Research Library
author: American Museum of Natural History

Lerner, Michael 1890-1978
birth: September 5, 1890
death: April 16, 1978
Field Associate
The Lerner Marine Laboratory, on Bimini in the Bahamas, was established in 1948, and given to the American Museum of Natural History by Michael Lerner
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Ichthyology.