American Museum of Natural History Research Library
author: American Museum of Natural History

La Monte, Francesca Raimonde, 1895-1982
birth: June 5, 1895
death: 1982
see full description in AMNH Archives database: https://data.library.amnh.org/archives/agents/amnhp_1001214
Associate Curator
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Ichthyology.