American Museum of Natural History Research Library
author: American Museum of Natural History

Hiss, Philip Hanson 1910-1988
birth: 1910
death: October 24, 1988
architectural designer
Traveler, photographer, regional director of the U.S. Information Agency in the Netherlands; also worked for the Dutch Government