American Museum of Natural History Research Library
author: American Museum of Natural History

Gray, Alice 1914-1994
birth: 1914
death: April 25, 1994
Scientific Assistant (AMNH Department of Insects and Spiders)
Alice Gray worked at the American Museum of Natural History beginning in 1937. Gray was an entomologist and origami enthusiast. She was also the art director of the Origamian
Worked at the American Museum of Natural History.
Trustee, American Museum of Natural History.