American Museum of Natural History Research Library
author: American Museum of Natural History

Freuchen, Peter 1886-1957
birth: 1886
death: September 4, 1957
Explorer
Peter Freuchen was an Arctic explorer. The American Museum of Natural History has a film with an interview by Charles Collingwood filmed at the museum. Freuchen tells about the difficulties of living in Greenland, and the lives of the Eskimo people (Film Collection no. 71)