American Museum of Natural History Research Library
author: American Museum of Natural History

Franklin, Kenneth L.
birth: March 25, 1923
death: June 18, 2007
Astronomer
Kenneth Linn Franklin was long the Hayden Planetarium's top astronomer; his accomplishments included helping pinpoint the first noise known to have come from another planet and inventing a watch for use on the moon
Worked at the American Museum of Natural History in Hayden Planetarium.