American Museum of Natural History Research Library
author: American Museum of Natural History

Ferraglio, Ludwig G. 1911-
Artist (AMNH Arts and Preparation)
Ludwig G. Ferraglio was an artist at the American Museum of Natural History. The museum library has preparatory studies for the Coral Reef Group in the Hall of Ocean Life and the Great Barrier Reef Group in the Fish Hall (1941) created by Ferraglio
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Exhibition.