American Museum of Natural History Research Library
author: American Museum of Natural History

Falkenbach, Otto 1878-1952
birth: 1878
death: October 3, 1952
Restorer, gilder (AMNH Paleontology Laboratory)
The American Museum of Natural History has a restoration of a Pachycephalosaurus head done by Otto Falkenbach. (Art Survey No. 583)
Worked at the American Museum of Natural History.