American Museum of Natural History Research Library
author: American Museum of Natural History

Clark, Eugenie
birth: May 4, 1922
death: February 25, 2015
Eugenie Clark was an American ichthyologist noted for her research on poisonous fishes of the tropical seas and on the behaviour of sharks. ("Eugenie Clark." Encyclopaedia Britannica. Britannica Academic. Encyclopædia Britannica Inc., 2015. Web. 08 Jul. 2015.) Clark worked in the American Museum of Natural History as a Research Associate in the Department of Animal Behavior and the Department of Fishes. She was also an avid marine conservationist