American Museum of Natural History Research Library
author: American Museum of Natural History

Chapman, Frank M. (Frank Michler), 1864-1945
birth: 1864
death: November 1945
Ornithologist and Curator
Worked at the American Museum of Natural History in the Department of Ornithology.