American Museum of Natural History Research Library
author: American Museum of Natural History

Campbell, G. F.
birth: 1915
death: October 9, 1988
Exhibition Preparer
George F. Campbell created an ink drawing of the American Museum of Natural History Roosevelt Rotunda, a cut out showing a ramp to a terrace with chairs, tables and umbrellas with a view of Central Park and the reservoir in the background. This was a proposed elevated terrace above the Roosevelt Memorial entrance done in the 1950s