American Museum of Natural History Research Library
author: American Museum of Natural History

Bumpus, Hermon C. (Hermon Carey) 1862-1943
birth: May 5, 1862
death: June 21, 1943
Curator (AMNH Invertebrate Paleontology)and First Director of AMNH
Worked at the American Museum of Natural History.