American Museum of Natural History Research Library
author: American Museum of Natural History

Alexandria, Gateway to the East (Exhibition)
birth: 1974 January 2
death: 1974 January 31
Exhibition. Opened January 2, 1974 and closed January 31, 1974. Located in the New York State Roosevelt Memorial at the American Museum of Natural History. "Alexandria, Gateway to the East" featured a diorama presenting a bird's-eye view of the city in A.D. 150.
Summary
"Alexandria, Gateway to the East" featured a diorama presenting a bird's-eye view of the city in A.D. 150. The small exhibition was a forerunner of numerous dioramas which were being constructed for the Hall of Peoples of Asia, which was under the direction of Walter A. Fairservis, Research Associate in the Department of Anthropology. The three-dimensional model, capturing the grandeur of ancient Alexandria, was on view in the Roosevelt Memorial Hall, on the second floor, of the American Museum of Natural History during the month of January 1974 as the Exhibit of the Month.
Individuals and institutions involved in the creation of the exhibition: Walter A. Fairservis, Jr., Research Associate, AMNH Department of Anthropology.