American Museum of Natural History Research Library
author: American Museum of Natural History

Live Praying Mantis (Exhibition)
birth: 1970 October 1
death: 1970 October 31
Exhibition. Opened October 1, 1970 and closed October 31, 1970. Located in the Grand Gallery at the American Museum of Natural History. "Live Praying Mantis" featured two live specimens of praying mantis and egg cases.
Summary
"Live Praying Mantis" featured two live specimens of praying mantis and egg cases. The mantis were on view in the 77th Street Foyer of the American Museum of Natural History during the month of October 1970 as the Exhibit of the Month.