American Museum of Natural History Research Library
author: American Museum of Natural History

Theodore Roosevelt Centennial (Exhibition)
birth: 1957 November
death: unknown
Exhibition. Opened November 1957. Located in the New York State Roosevelt Memorial. at the American Museum of Natural History. "Theodore Roosevelt Centennial" was an exhibition tribute to Theodore Roosevelt observing the centennial year of the birth of the 26th president.
Summary
"Theodore Roosevelt Centennial" was an exhibition tribute to Theodore Roosevelt observing the centennial year of the birth of the 26th president. The exhibition featured points of interest relating to Theodore Roosevelt in Oyster Bay, Long Island, in New York City, in North Dakota and in Washington, D.C., including maps giving instructions for travelers. Also included were pictures, memorabilia, and suggested reading lists. The exhibition was on view on the first floor of the Roosevelt Memorial Building of the American Museum of Natural History starting in November 1957.