American Museum of Natural History Research Library
author: American Museum of Natural History

Insect Watercolors by John Cody (Exhibition)
birth: 1949 December 7
death: 1950 January 2
Exhibition. Opened December 7, 1949 and closed January 2, 1950. Located in the New York State Roosevelt Memorial at the American Museum of Natural History. "Insect Watercolors by John Cody" featured approximately 20 watercolors, primarily of butterflies and moths, combined artistic composition and scientific accuracy
Summary
"Insect Watercolors by John Cody" featured approximately 20 watercolors, primarily of butterflies and moths, combined artistic composition and scientific accuracy. The paintings were on view in the Roosevelt Memorial Hall (first floor) of the American Museum of Natural History from December 7, 1949 through January 2, 1950.