American Museum of Natural History Research Library
author: American Museum of Natural History

Drawn from the Sea: Art in the Service of Ichthyology (Exhibition)
birth: 1988 October 7
death: 1988 December 11
Exhibition. Opened in October 7, 1988 and closed December 11, 1988. Located on Floor 2 in the Akeley Gallery at the American Museum of Natural History. "Drawn from the Sea: Art in the Service of Ichthyology" was an exhibition of 95 fish illustrations dating from 1938 to 1980.
Summary
"Drawn from the Sea: Art in the Service of Ichthyology" was an exhibition of 95 fish illustrations dating from 1938 to 1980. The exhibit presented the history, techniques and uses of scientific illustration. More than 20 artists were represented including Joseph Drayton, Charles Bradford Hudson and Kumataro Ito. Michael L. Smith, Kalbfleisch assistant curator in the Department of Herpetology and Ichthyology, was the curator of the exhibition. The exhibition was organized by the Smithsonian Institution's National Museum of Natural History. The illustrations were on view in the Akeley Gallery of the American Museum of Natural History from October 7 though December 11, 1988. The exhibition then traveled under the auspices of the Smithsonian Institution Traveling Exhibit Service to the McAllen International Museum in McAllen, Texas.
Individuals and institutions involved in the creation of the exhibition: National Museum of Natural History, Smithsonian Institution; Michael L. Smith; AMNH Department of Herpetology; AMNH Department of Ichthyology.