American Museum of Natural History Research Library
author: American Museum of Natural History

Theodore Roosevelt: A Natural Naturalist (Exhibition)
birth: 1983 November, approximately
death: 1984 January 4
Exhibition. Opened November 1983, approximately, and closed January 4, 1983. Located in Section 12, Floor 2 in the Theodore Roosevelt Rotunda. Theodore Roosevelt: A Natural Naturalist marked Theodore Roosevelt's 125th birthday and featured memorabilia and photographs.
Summary
Theodore Roosevelt: A Natural Naturalist marked Theodore Roosevelt's 125th birthday and featured memorabilia and photographs, which focused on his travels, studies of bird coloration, and conservation measures enacted when he was President (1, p. 1; 2, p. 1). The exhibition was installed by the Department of Exhibition and Graphics (3, p. 56).
This is a condensed summary of the exhibition. For additional information, see Sources and/or Related Resources.