American Museum of Natural History Research Library
author: American Museum of Natural History

American Museum of Natural History. Upper Hall.; Third Floor; Geological Hall
birth: 1877
Historic hall.
The Upper Hall, also known as the Geological Hall or the Third Floor, was one of the first exhibition halls in the American Museum of Natural History's first building. At the opening of the new building, the Upper Hall on the now-fourth floor contained the James Hall Collection which included geological specimens, invertebrates and fossils. (1, p. 61)