American Museum of Natural History Research Library
author: American Museum of Natural History

American Museum of Natural History. Main Hall.; Principal Story; Principal Hall
birth: 1877
Historic hall.
The Main Hall, also known as the Principal Story or Principal Hall, was one of the first exhibition halls in the American Museum of Natural History's first building. At the opening of the new building, the Main Hall on the second floor contained bird cases. (1, p. 59)