American Museum of Natural History Research Library
author: American Museum of Natural History

American Museum of Natural History. Mollusks of New York State (Exhibit); Shells of the New York Area; Shells
birth: 1972
death: present
Permanent exhibition. Opened Fall 1972. Located on Floor 1, Section WC. The Mollusks of New York State at the American Museum of Natural History was planned by William K. Emerson, William E. Old, and Harold S. Feinberg of the Department of Invertebrate Zoology (2, 1971/72, p. 27), and showcases common mollusks of the region (1, 1972, p. 78). It shares a corridor with the Evelyn Miles Keller Memorial Exhibit, which also exhibits mollusks.