American Museum of Natural History Research Library
author: American Museum of Natural History

Henry, G. Reid
G. REID HENRY was the final leader of WSSE. After WSSE was placed on a brief hiatus due to World War II, Henry continued field research for less than a year in 1941 until the expedition was officially closed.