American Museum of Natural History Research Library
author: American Museum of Natural History

Henry, G. Reid
Henry acted as researcher and leader of the Whitney South Sea Expedition of the American Museum of Natural History for one year after active collecting resumed progress following a brief hiatus brought on by WWII