American Museum of Natural History Research Library
author: American Museum of Natural History

Dyott, G. M. (George Miller) 1883-1972
Dyott was a photographer sent on the 1923 Faunthorpe-Vernay Expedition to photograph and collect motion picture footage. He was equipped with an Akeley camera