American Museum of Natural History Research Library
author: American Museum of Natural History

White, Alexander M.
birth: March 24, 1904
death: November 28, 1968
Alexander M. White was the President of the American Museum of Natural History from 1951 to 1968. He served on the Museum's Board of Trustees starting in 1947 and was Chairman in 1968
Trustee, American Museum of Natural History.