American Museum of Natural History Research Library
author: American Museum of Natural History

Vokes, Harold Ernest 1908-1998
birth: 1908
death: 1988
Assistant Curator
Harold Ernest Vokes worked in the Department of Paleontology at the American Museum of Natural History. He was the Acting Chairman and Associate Curator of Fossil Invertebrates when he resigned in 1943
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Vertebrate Paleontology.