American Museum of Natural History Research Library
author: American Museum of Natural History

Vaillant, George Clapp 1901-1945
birth: April 5, 1901
death: May 13, 1945
George Clapp Vaillant was an associate curator of Mexican Archeology in the Department of Anthropology at the American Museum of Natural History (1927-1941) before becoming director of the university museum of the University of Pennyslyvania
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Anthropology.