American Museum of Natural History Research Library
author: American Museum of Natural History

Sanford, L. C. (Leonard Cutler) 1868-1950
birth: September 19, 1868
death: December 7, 1950
Ornithologist
Leonard Cutler Sanford contributed to the ornithological collections of the American Museum of Natural History
Trustee, American Museum of Natural History.