American Museum of Natural History Research Library
author: American Museum of Natural History

Mead, Charles W. (Charles Williams) 1845-1928
birth: 1845
death: February 3, 1928
Assistant Curator
Honorary curator of Peruvian archaeology at AMNH, in the active service of AMNH from 1897-1926
Worked at the American Museum of Natural History in American Museum of Natural History. Department of Anthropology.