American Museum of Natural History Research Library
author: American Museum of Natural History

Mackay, William Andrew 1878-1939
birth: 1878
death: July 27, 1939
Muralist
The murals in the American Museum of Natural History Theodore Roosevelt Memorial were painted by William Andrew Mackay. They are symbolic representations of notable incidents in the career of Theodore Roosevelt